 Registration

Enter your registration information on this screen.

To enter registration information

1	In the Name box, type your name.

2	In the Company box, type your company's name if applicable.

To continue

Choose the Next button.

To exit

Choose the Exit button to exit from Setup.


 Registration Confirmation

This screen prompts you to confirm the registration information you entered in the previous screen.

To continue

Choose the Next button to save this information and continue Setup.

To edit registration information

Choose the Back button to return to the previous screen and change this information.

To exit

Choose the Exit button to exit from Setup.


Select Sound Board and Microphone
  Select Sound Board

This screen lets you select the type of sound board you will use with VoicePad Pro.

To select a sound board

Accept the displayed values or select a different type of sound board from the drop-down list.  For any of the following sound boards, select Other Mwave: Standard Office F/X board, IBM MultiMedia modem, ACE modem, ObJIX modem, or Tecmar MegaPhone board.

To continue

Choose the Next button.

To exit

Choose the Exit button to exit from Setup.


 Kurzweil APA Sound Board

This screen lets you change the Kurzweil APA sound board configuration.

To change the current settings

Select new values from the drop-down lists.
I/O Address:  Change the I/O address if the default setting conflicts with another device.  If you change the I/O address, you must also change switches on the board according to this table:

I/O Address	Switches

	1	2	3	4	5	6	7	8
290	On	Off	On	On	Off	On	Off	On
298	Off	Off	On	On	Off	On	Off	On
2A0	On	On	Off	On	Off	On	Off	On
2A8	Off	On	Off	On	Off	On	Off	On
280	On	On	On	On	Off	On	Off	On
288	Off	On	On	On	Off	On	Off	On
Interrupt:  Change the interrupt if the default value conflicts with another device.  Suggested alternate settings are 2, 3, or 5.

To continue

Choose the Next button.

To exit

Choose the Exit button to exit from Setup.


  Specify Installation Directory

This screen lets you compare the Space Required and Space Available figures to see if you need to make a change in the installation directory for VoicePad Pro.

To change the setup directory location

1	Choose the Change Directory button.

2	Type the name of the new directory, including the path; or use the Browse button to locate the directory.
EXAMPLE:  C:\MYAPPS\VPWIN.

3	Choose the Next button.

To continue

When you are satisfied with the directory, choose the Install Files button.  VoicePad Pro begins installing the files.

To exit

Choose the Exit button to exit from Setup.